<template>
  <NuxtLayout>
    <NuxtPage />
  </NuxtLayout>
</template>

<style>
/* #__nuxt * {
  border: 1px solid rgba(255,255,0,0.3)
} */
html, body {
  overscroll-behavior-x: none;
}
</style>